<template>
services.hedgedoc = {
  enable = true;
  settings.domain = "hedgedoc.nixin.local";
  settings.port = 8001;
  settings.host = "0.0.0.0";
  settings.protocolUseSSL = false;
  settings.allowOrigin = [
    "localhost"
    "hedgedoc.nixin.local"
  ];
};
</template>

